⃗F = − GMm r^2 r̂

ρ(r) = ρ_0 ( 1 + r^2 b^2

)_{−5/2}

⃗F = − G M^{int} m r^2 r̂ ∇^2Φ = 4πGρ

100, 000 parsecs 1000

= 100 parsecs