relative mag of star X = 0.0 − 2.5 log_{10} (\frac{intensity of X}{intensity of ref} )

percentage uncertainty = \frac{standard deviation}{mean} phase ϕ = (\frac{t}{Period}) − int (\frac{t}{Period})