\magnification=\magstep1

$$
R(t) \quad = \quad R_0 + v(t - t_0) 
$$

$$
F(t) \quad = \quad 4 \pi {R(t)}^2 \ \xi^2 \ B_{\nu}(T) 
$$

\bye
