avg intensity within R I_a(R) =

∫_R 0 I(r)2πrdr πR^2

at the Petrosian radius R_P I(R_P ) = η

(∫_{RP}

0 I(r)2πrdr πR^2_P )

F_P =

∫_{kRP} 0 I(r)2πrdr C = r_{90} r_{50}