f_λ(λ) = ergs/cm^2/s/Angstrom

N = ∫ f_λ(λ) T (λ) hc/λ dλ photons/cm^2/s

N(z) =

∫ f_λ(_{λ1+z} ) T (λ)

hc/λ dλ photons/cm^2/s