Rot KE = 1 2 Iω^2 Rot KE_f = Rot KE_i + Work_{net} Rot KE_f = Rot KE_i + ∫ ⃗τ_{net} · ⃗dθ |τ| = |r| |F | sin(θ) ⃗r = r_x î + r_y ĵ + r_z k̂ ⃗F = F_x î + F_y ĵ + F_z k̂ ⃗r = 3 mî + 0 mĵ − 5 m k̂ ⃗F = 6 Nî + 2 N ĵ + 0 Nk̂ 5 × 3 = 15 ⃗A = 5î + 8ĵ ⃗B = 1î − 3ĵ |A × B| = |A| |B| sin(θ) ⃗A = 5î + 8ĵ + 0k̂ ⃗B = 1î − 3ĵ + 0k̂ A × B = [(8)(0) − (0)(−3)] î − [(0)(5) − (1)(0)] ĵ + [(5)(−3) − (8)(1)] k̂ = 0î + 0ĵ − 23k̂ ⃗A = 1î + 2ĵ + 3k̂ ⃗B = 3î + 2ĵ + 1k̂